Main Entrance

Cloak- -Room

Elevator WC Old Stairs

Lodge

Supper, Posters, Welcome Reception

Office Registration, Computers

WC WC

New Stairs

To Lecture Floor

Elevator WC Old Stairs

Cash Counter Lecture Hall

WC WC

New Stairs

To Ground Floor

Lecture Floor

Ground Floor

Plan of the Institute